-- Add admin authentication
INSERT OR IGNORE INTO config (key, value, description) VALUES
    ('admin_password_hash', '$2a$12$foWbCgnovjZxmfE1fbut9uJlMCWrx.KrGUbmKlDH727B4JB7YUZEe', 'Admin password hash (default: admin123)');